MS5015 22-12 Circular MIL Spec Connector

Mil-C-5015 series connectors conform to US Harsh Environment Connectors Mil-C-5015 standard (GJB600), with high strength Aluminum Alloy shell, Synthetic rubber insulator, threaded coupling, Alternate insert positioning, solder and crimping terminal, low cost, simple and practical design, widely used in industrial machinery and equipment, Harsh Environment Connectors, defense equipment, marine, automobile industry, instrument, and servo motor, etc. Our connectors can replace European and American similar products.

The Most Amazing Connector Yet Since in Renhotec Applications

The MS5015 series connectors are available in various plug and receptacle styles, including MS3100, MS3101, MS3102, MS3106, and MS3108.

MIL-C-5015, characterized by its threaded coupling, single key, and keyway polarization, embodies simplicity in design. They find extensive use in industrial machinery, defense ground support equipment, munitions, and maritime installations. The MIL-C-5015 connectors come in classes A, B, E/F, R, and also provide a variety of pre-earth connectors. Hence, Renhotec is your go-to place for finding the perfect connector that meets your specific conditions and performance requirements.

Drawing

MS3101

MS3102

MS3106

MS3108

FAQ

1.What is the meaning of MIL-DTL-5015?

MIL-DTL-5015 is a United States Mil Standard which covers heavy-duty circular electrical connectors with soldered or crimped contacts. Defense, aerospace, and industrial machinery commonly use them for both digital and analog signals, as well as power distribution.

2.What is the IP rating of MIL-DTL-5015?

MIL-DTL-5015 connectors are IP67 rated for high-performance in critical applications. Aerospace-grade aluminum shells provide heavy-duty protection while a standard olive drab cadmium finish provides excellent corrosion resistance.

3.What are the different types of MIL connectors?

Series 1: bayonet coupling mechanism with scoop-proof design.
Series 2: bayonet coupling with a low-profile design to meet weight and space restrictions.
Series 3: self-locking threaded coupling mechanism.
Series 4: breech-lock coupling mechanism.

Application

MS5015 connectors are anti-knock, damp proof, flame-retarded, anti-corrosion, heat-resistant and dust-proof. Apply to industrial medical aviation and other major fields.

The post MS5015 22-12 Circular MIL Spec Connector appeared first on Renhotec Pro.